                         Plot Function Menu

        When a chart has been displayed on the monitor, the special
    plot functions are enabled through the following keys:

         F1...Measurement line cursor ON/OFF
           When the line cursor is ON, the following 3 keys are active:
              ->...Move cursor right one quote
              <-...Move cursor left one quote
               p...Print values of price, volume and moving averages for date
                   marked by cursor
         F2...Volume bar ON/OFF
         F3...Moving averages ON/OFF
         F4...Price bar ON/OFF
         F5...Envelope ON/OFF
         F6...User drawn lines ON/OFF
         F7...Grid ON/Off
         F8...Redraw original chart
         F9...User specified chart scaling
        F10...Line draw mode
      ALT-S...Save Lines on disk
      ALT-R...Restore previously saved lines from disk.
